Plot file version 1 created 12-JUN-2025 10:04:55 NCP P.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:21:50 to 00/18:25:19

10*Log10(Amp) Jy

Frequency MHz

250 300 350 400 450

15 10 5 0 -5 -10 -15 -20 -25 (RR)

1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16

Plot file version 2 created 12-JUN-2025 10:05:01 NCP P.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:21:50 to 00/18:25:19

10*Log10(Amp) Jy

Frequency MHz

250 300 350 400 450

15 10 5 0 -5 -10 -15 -20 -25 (LL)

1 2 3 4 5 6 7 8 9 10 11 12 13 14 15 16

Plot file version 1 created 12-JUN-2025 10:05:10 NCP L.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:23:43 to 00/18:24:42

10*Log10(Amp) Jy

Frequency MHz

1000 1200 1400 1600 1800 2000

15 10 5 0 -5 -10 -15 -20 -25 -30 -35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:05:24 NCP L.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:23:43 to 00/18:24:42

10*Log10(Amp) Jy

Frequency MHz

1000 1200 1400 1600 1800 2000

20

10

0

-10

-20

-30

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:05:43 NCP S1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:24:27 to 00/18:25:25

10*Log10(Amp) Jy

Frequency GHz

2.0 2.2 2.4 2.6 2.8 3.0

15 10 5 0 -5 -10 -15 -20 -25 -30 -35 IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:05:59 NCP S1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:24:27 to 00/18:25:25

10*Log10(Amp) Jy

Frequency GHz

2.0 2.2 2.4 2.6 2.8 3.0

15 10 5 0 -5 -10 -15 -20 -25 -30 -35 IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:06:45 NCP S2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:25:14 to 00/18:26:13

10*Log10(Amp) Jy

Frequency GHz

3.0 3.2 3.4 3.6 3.8 4.0

-5 -10 -15 -20 -25 -30 -35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:07:03 NCP S2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:25:14 to 00/18:26:13

10*Log10(Amp) Jy

Frequency GHz

3.0 3.2 3.4 3.6 3.8 4.0

-10

-15

-20

-25

-30

-35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:07:17 NCP C1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:26:22 to 00/18:27:20

10*Log10(Amp) Jy

Frequency GHz

4.0 4.2 4.4 4.6 4.8 5.0

-5 -10 -15 -20 -25 -30 -35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:07:28 NCP C1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:26:22 to 00/18:27:20

10*Log10(Amp) Jy

Frequency GHz

4.0 4.2 4.4 4.6 4.8 5.0

-5 -10 -15 -20 -25 -30 -35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:08:09 NCP C2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:27:14 to 00/18:28:13

10*Log10(Amp) Jy

Frequency GHz

5.0 5.2 5.4 5.6 5.8 6.0

15 10 5 0 -5 -10 -15 -20 -25 -30 -35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:08:22 NCP C2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:27:14 to 00/18:28:13

10*Log10(Amp) Jy

Frequency GHz

5.0 5.2 5.4 5.6 5.8 6.0

15 10 5 0 -5 -10 -15 -20 -25 -30 -35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:09:28 NCP C4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:29:15 to 00/18:30:13

10*Log10(Amp) Jy

Frequency GHz

7.0 7.2 7.4 7.6 7.8 8.0

-15

-20

-25

-30

-35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:09:44 NCP C4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:29:15 to 00/18:30:13

10*Log10(Amp) Jy

Frequency GHz

7.0 7.2 7.4 7.6 7.8 8.0

-15

-20

-25

-30

-35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:09:58 NCP X1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:30:20 to 00/18:31:17

10*Log10(Amp) Jy

Frequency GHz

8.0 8.2 8.4 8.6 8.8 9.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:10:16 NCP X1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:30:20 to 00/18:31:17

10*Log10(Amp) Jy

Frequency GHz

8.0 8.2 8.4 8.6 8.8 9.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:10:35 NCP X2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:31:15 to 00/18:32:12

10*Log10(Amp) Jy

Frequency GHz

9.0 9.2 9.4 9.6 9.8 10.0

5 0 -5 -10 -15 -20 -25 -30 -35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:10:56 NCP X2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:31:15 to 00/18:32:12

10*Log10(Amp) Jy

Frequency GHz

9.0 9.2 9.4 9.6 9.8 10.0

5 0 -5 -10 -15 -20 -25 -30 -35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:11:10 NCP X3.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:32:15 to 00/18:33:13

10*Log10(Amp) Jy

Frequency GHz

10.0 10.2 10.4 10.6 10.8 11.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:11:29 NCP X3.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:32:15 to 00/18:33:13

10*Log10(Amp) Jy

Frequency GHz

10.0 10.2 10.4 10.6 10.8 11.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:11:43 NCP X4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:33:14 to 00/18:34:13

10*Log10(Amp) Jy

Frequency GHz

11.0 11.2 11.4 11.6 11.8 12.0

-10

-15

-20

-25

-30

-35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:12:00 NCP X4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:33:14 to 00/18:34:13

10*Log10(Amp) Jy

Frequency GHz

11.0 11.2 11.4 11.6 11.8 12.0

-10

-15

-20

-25

-30

-35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:12:14 NCP U1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:34:27 to 00/18:35:25

10*Log10(Amp) Jy

Frequency GHz

12.0 12.2 12.4 12.6 12.8 13.0

-5 -10 -15 -20 -25 -30 -35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:12:34 NCP U1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:34:27 to 00/18:35:25

10*Log10(Amp) Jy

Frequency GHz

12.0 12.2 12.4 12.6 12.8 13.0

-5 -10 -15 -20 -25 -30 -35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:12:53 NCP U2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:35:14 to 00/18:36:13

10*Log10(Amp) Jy

Frequency GHz

13.0 13.2 13.4 13.6 13.8 14.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:13:33 NCP U3.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:36:14 to 00/18:37:12

10*Log10(Amp) Jy

Frequency GHz

14.0 14.2 14.4 14.6 14.8 15.0

-20

-25

-30

-35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:13:48 NCP U4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:37:15 to 00/18:38:12

10*Log10(Amp) Jy

Frequency GHz

15.0 15.2 15.4 15.6 15.8 16.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:14:01 NCP U4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:37:15 to 00/18:38:12

10*Log10(Amp) Jy

Frequency GHz

15.0 15.2 15.4 15.6 15.8 16.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:14:18 NCP U5.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:38:15 to 00/18:39:13

10*Log10(Amp) Jy

Frequency GHz

16.0 16.2 16.4 16.6 16.8 17.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:14:30 NCP U5.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:38:15 to 00/18:39:13

10*Log10(Amp) Jy

Frequency GHz

16.0 16.2 16.4 16.6 16.8 17.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:14:56 NCP U6.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:39:15 to 00/18:40:13

10*Log10(Amp) Jy

Frequency GHz

17.0 17.2 17.4 17.6 17.8 18.0

-10

-15

-20

-25

-30

-35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:15:09 NCP U6.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:39:15 to 00/18:40:13

10*Log10(Amp) Jy

Frequency GHz

17.0 17.2 17.4 17.6 17.8 18.0

-10

-15

-20

-25

-30

-35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:15:24 NCP K1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:40:19 to 00/18:41:17

10*Log10(Amp) Jy

Frequency GHz

18.0 18.2 18.4 18.6 18.8 19.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:15:37 NCP K1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:40:19 to 00/18:41:17

10*Log10(Amp) Jy

Frequency GHz

18.0 18.2 18.4 18.6 18.8 19.0

-20

-25

-30

-35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:15:56 NCP K2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:41:14 to 00/18:42:13

10*Log10(Amp) Jy

Frequency GHz

19.0 19.2 19.4 19.6 19.8 20.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38 IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:16:09 NCP K2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:41:14 to 00/18:42:13

10*Log10(Amp) Jy

Frequency GHz

19.0 19.2 19.4 19.6 19.8 20.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38 IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:17:42 NCP K3.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:42:14 to 00/18:43:13

10*Log10(Amp) Jy

Frequency GHz

20.0 20.2 20.4 20.6 20.8 21.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:17:56 NCP K3.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:42:14 to 00/18:43:13

10*Log10(Amp) Jy

Frequency GHz

20.0 20.2 20.4 20.6 20.8 21.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:18:43 NCP K5.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:44:15 to 00/18:45:12

10*Log10(Amp) Jy

Frequency GHz

22.0 22.2 22.4 22.6 22.8 23.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:18:56 NCP K5.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:44:15 to 00/18:45:12

10*Log10(Amp) Jy

Frequency GHz

22.0 22.2 22.4 22.6 22.8 23.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:19:13 NCP K6.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:45:15 to 00/18:46:12

10*Log10(Amp) Jy

Frequency GHz

23.0 23.2 23.4 23.6 23.8 24.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:19:26 NCP K6.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:45:15 to 00/18:46:12

10*Log10(Amp) Jy

Frequency GHz

23.0 23.2 23.4 23.6 23.8 24.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:19:41 NCP K7.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:46:15 to 00/18:47:13

10*Log10(Amp) Jy

Frequency GHz

24.0 24.2 24.4 24.6 24.8 25.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:19:55 NCP K7.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:46:15 to 00/18:47:13

10*Log10(Amp) Jy

Frequency GHz

24.0 24.2 24.4 24.6 24.8 25.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:20:10 NCP K8.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:47:15 to 00/18:48:13

10*Log10(Amp) Jy

Frequency GHz

25.0 25.2 25.4 25.6 25.8 26.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:20:22 NCP K8.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:47:15 to 00/18:48:13

10*Log10(Amp) Jy

Frequency GHz

25.0 25.2 25.4 25.6 25.8 26.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:20:55 NCP K9.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:48:14 to 00/18:49:13

10*Log10(Amp) Jy

Frequency GHz

26.0 26.2 26.4 26.6 26.8 27.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:21:08 NCP K9.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:48:14 to 00/18:49:13

10*Log10(Amp) Jy

Frequency GHz

26.0 26.2 26.4 26.6 26.8 27.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:21:22 NCP A1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:49:19 to 00/18:50:17

10*Log10(Amp) Jy

Frequency GHz

26.0 26.2 26.4 26.6 26.8 27.0

-15

-20

-25

-30

-35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:21:33 NCP A1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:49:19 to 00/18:50:17

10*Log10(Amp) Jy

Frequency GHz

26.0 26.2 26.4 26.6 26.8 27.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:22:11 NCP A2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:50:14 to 00/18:51:12

10*Log10(Amp) Jy

Frequency GHz

27.0 27.2 27.4 27.6 27.8 28.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:22:52 NCP A3.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:51:15 to 00/18:52:12

10*Log10(Amp) Jy

Frequency GHz

28.0 28.2 28.4 28.6 28.8 29.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:23:11 NCP A4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:52:15 to 00/18:53:13

10*Log10(Amp) Jy

Frequency GHz

29.0 29.2 29.4 29.6 29.8 30.0

10 5 0 -5 -10 -15 -20 -25 -30 -35

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:23:24 NCP A4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:52:15 to 00/18:53:13

10*Log10(Amp) Jy

Frequency GHz

29.0 29.2 29.4 29.6 29.8 30.0

10 5 0 -5 -10 -15 -20 -25 -30 -35

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:23:39 NCP A5.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:53:14 to 00/18:54:13

10*Log10(Amp) Jy

Frequency GHz

30.0 30.2 30.4 30.6 30.8 31.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:23:52 NCP A5.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:53:14 to 00/18:54:13

10*Log10(Amp) Jy

Frequency GHz

30.0 30.2 30.4 30.6 30.8 31.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:24:07 NCP A6.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:54:15 to 00/18:55:13

10*Log10(Amp) Jy

Frequency GHz

31.0 31.2 31.4 31.6 31.8 32.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:24:20 NCP A6.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:54:15 to 00/18:55:13

10*Log10(Amp) Jy

Frequency GHz

31.0 31.2 31.4 31.6 31.8 32.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:24:36 NCP A7.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:55:14 to 00/18:56:13

10*Log10(Amp) Jy

Frequency GHz

32.0 32.2 32.4 32.6 32.8 33.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:24:48 NCP A7.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:55:14 to 00/18:56:13

10*Log10(Amp) Jy

Frequency GHz

32.0 32.2 32.4 32.6 32.8 33.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:25:04 NCP A8.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:56:14 to 00/18:57:12

10*Log10(Amp) Jy

Frequency GHz

33.0 33.2 33.4 33.6 33.8 34.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38 IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:25:17 NCP A8.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:56:14 to 00/18:57:12

10*Log10(Amp) Jy

Frequency GHz

33.0 33.2 33.4 33.6 33.8 34.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38 IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:25:33 NCP A9.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:57:15 to 00/18:58:12

10*Log10(Amp) Jy

Frequency GHz

34.0 34.2 34.4 34.6 34.8 35.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:25:46 NCP A9.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:57:15 to 00/18:58:12

10*Log10(Amp) Jy

Frequency GHz

34.0 34.2 34.4 34.6 34.8 35.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:26:42 NCP A11.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:59:14 to 00/19:00:13

10*Log10(Amp) Jy

Frequency GHz

36.0 36.2 36.4 36.6 36.8 37.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:26:54 NCP A11.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/18:59:14 to 00/19:00:13

10*Log10(Amp) Jy

Frequency GHz

36.0 36.2 36.4 36.6 36.8 37.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:27:15 NCP A12.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:00:15 to 00/19:01:13

10*Log10(Amp) Jy

Frequency GHz

37.0 37.2 37.4 37.6 37.8 38.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:27:28 NCP A12.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:00:15 to 00/19:01:13

10*Log10(Amp) Jy

Frequency GHz

37.0 37.2 37.4 37.6 37.8 38.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:27:49 NCP A13.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:01:15 to 00/19:02:13

10*Log10(Amp) Jy

Frequency GHz

38.0 38.2 38.4 38.6 38.8 39.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:28:02 NCP A13.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:01:15 to 00/19:02:13

10*Log10(Amp) Jy

Frequency GHz

38.0 38.2 38.4 38.6 38.8 39.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:28:20 NCP A14.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:02:15 to 00/19:03:12

10*Log10(Amp) Jy

Frequency GHz

39.0 39.2 39.4 39.6 39.8 40.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:28:33 NCP A14.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:02:15 to 00/19:03:12

10*Log10(Amp) Jy

Frequency GHz

39.0 39.2 39.4 39.6 39.8 40.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:28:50 NCP A15.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:03:14 to 00/19:04:13

10*Log10(Amp) Jy

Frequency GHz

40.0 40.2 40.4 40.6 40.8 41.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38 IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:29:02 NCP A15.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:03:14 to 00/19:04:13

10*Log10(Amp) Jy

Frequency GHz

40.0 40.2 40.4 40.6 40.8 41.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38 IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:29:19 NCP Q1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:04:18 to 00/19:05:16

10*Log10(Amp) Jy

Frequency GHz

39.0 39.2 39.4 39.6 39.8 40.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:29:33 NCP Q1.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:04:18 to 00/19:05:16

10*Log10(Amp) Jy

Frequency GHz

39.0 39.2 39.4 39.6 39.8 40.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:29:50 NCP Q2.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:05:15 to 00/19:06:12

10*Log10(Amp) Jy

Frequency GHz

40.0 40.2 40.4 40.6 40.8 41.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:30:31 NCP Q3.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:06:14 to 00/19:07:13

10*Log10(Amp) Jy

Frequency GHz

41.0 41.2 41.4 41.6 41.8 42.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:30:46 NCP Q4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:07:14 to 00/19:08:13

10*Log10(Amp) Jy

Frequency GHz

42.0 42.2 42.4 42.6 42.8 43.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:30:59 NCP Q4.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:07:14 to 00/19:08:13

10*Log10(Amp) Jy

Frequency GHz

42.0 42.2 42.4 42.6 42.8 43.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:31:14 NCP Q5.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:08:15 to 00/19:09:13

10*Log10(Amp) Jy

Frequency GHz

43.0 43.2 43.4 43.6 43.8 44.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:31:26 NCP Q5.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:08:15 to 00/19:09:13

10*Log10(Amp) Jy

Frequency GHz

43.0 43.2 43.4 43.6 43.8 44.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:31:41 NCP Q6.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:09:15 to 00/19:10:13

10*Log10(Amp) Jy

Frequency GHz

44.0 44.2 44.4 44.6 44.8 45.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:31:54 NCP Q6.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:09:15 to 00/19:10:13

10*Log10(Amp) Jy

Frequency GHz

44.0 44.2 44.4 44.6 44.8 45.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:32:08 NCP Q7.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:10:14 to 00/19:11:13

10*Log10(Amp) Jy

Frequency GHz

45.0 45.2 45.4 45.6 45.8 46.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:32:21 NCP Q7.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:10:14 to 00/19:11:13

10*Log10(Amp) Jy

Frequency GHz

45.0 45.2 45.4 45.6 45.8 46.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:32:36 NCP Q8.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:11:15 to 00/19:12:12

10*Log10(Amp) Jy

Frequency GHz

46.0 46.2 46.4 46.6 46.8 47.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:32:48 NCP Q8.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:11:15 to 00/19:12:12

10*Log10(Amp) Jy

Frequency GHz

46.0 46.2 46.4 46.6 46.8 47.0

-20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:33:08 NCP Q9.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:12:14 to 00/19:13:13

10*Log10(Amp) Jy

Frequency GHz

47.0 47.2 47.4 47.6 47.8 48.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:33:20 NCP Q9.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:12:14 to 00/19:13:13

10*Log10(Amp) Jy

Frequency GHz

47.0 47.2 47.4 47.6 47.8 48.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)

Plot file version 1 created 12-JUN-2025 10:34:03 NCP Q11.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:14:15 to 00/19:15:13

10*Log10(Amp) Jy

Frequency GHz

49.0 49.2 49.4 49.6 49.8 50.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38 IF 1(RR) IF 2(RR) IF 3(RR) IF 4(RR) IF 5(RR) IF 6(RR) IF 7(RR) IF 8(RR)

Plot file version 2 created 12-JUN-2025 10:34:16 NCP Q11.UVEVLA.1 No calibration applied and no bandpass applied

Scalar averaged cross-power spectrum Several baselines averaged Timerange: 00/19:14:15 to 00/19:15:13

10*Log10(Amp) Jy

Frequency GHz

49.0 49.2 49.4 49.6 49.8 50.0

-18 -20 -22 -24 -26 -28 -30 -32 -34 -36 -38

IF 1(LL) IF 2(LL) IF 3(LL) IF 4(LL) IF 5(LL) IF 6(LL) IF 7(LL) IF 8(LL)